R-L Difference BPMX3B

-1000

-800

-600

-400

-200 0 200 400 600 800 1000

7200 7300 7400 7500 7600 7700 7800

729.0 / 678 A0 -0.1510 3.107

../parity/april98/out_t/cc_out_t.hbk nm