Detector linearity - Slope of (A_{det} vs. A_{BCM1})

Run number

Slope

ΛslopeΓ = 0.994 Α 0.004

Run number

Slope

ΛslopeΓ = 0.998 Α 0.004

0 0.5 1 1.5 2 2.5 3

7200 7300 7400 7500 7600 7700 7800

0 0.5 1 1.5 2 2.5 3

7200 7300 7400 7500 7600 7700 7800